SET client_min_messages TO WARNING;
\set ECHO none
DROP TABLE IF EXISTS observatory.obs_table;
DROP TABLE IF EXISTS observatory.obs_column_table;
DROP TABLE IF EXISTS observatory.obs_column;
DROP TABLE IF EXISTS observatory.obs_column_tag;
DROP TABLE IF EXISTS observatory.obs_tag;
DROP TABLE IF EXISTS observatory.obs_column_to_column;
DROP TABLE IF EXISTS observatory.obs_65f29658e096ca1485bf683f65fdbc9f05ec3c5d;
DROP TABLE IF EXISTS observatory.obs_1a098da56badf5f32e336002b0a81708c40d29cd;
DROP TABLE IF EXISTS observatory.obs_fc050f0b8673cfe3c6aa1040f749eb40975691b7;
DROP TABLE IF EXISTS observatory.obs_1babf5a26a1ecda5fb74963e88408f71d0364b81;
DROP TABLE IF EXISTS observatory.obs_8764a6b439a4f8714f54d4b3a157bc5e36519066;
DROP TABLE IF EXISTS observatory.obs_3e7cc9cfd403b912c57b42d5f9195af9ce2f3cdb;
DROP TABLE IF EXISTS observatory.obs_d34555209878e8c4b37cf0b2b3d072ff129ec470;
DROP TABLE IF EXISTS observatory.obs_d39f7fe5959891c8296490d83c22ded31c54af13;
DROP TABLE IF EXISTS observatory.obs_144e8b4f906885b2e057ac4842644a553ae49c6e;
DROP TABLE IF EXISTS observatory.obs_c6fb99c47d61289fbb8e561ff7773799d3fcc308;
DROP TABLE IF EXISTS observatory.obs_ab038198aaab3f3cb055758638ee4de28ad70146;
