SET client_min_messages TO WARNING;
\set ECHO none
DROP TABLE IF EXISTS observatory.obs_table;
DROP TABLE IF EXISTS observatory.obs_column_table;
DROP TABLE IF EXISTS observatory.obs_column;
DROP TABLE IF EXISTS observatory.obs_column_tag;
DROP TABLE IF EXISTS observatory.obs_tag;
DROP TABLE IF EXISTS observatory.obs_column_to_column;
DROP TABLE IF EXISTS observatory.obs_dump_version;
DROP TABLE IF EXISTS observatory.obs_meta;
DROP TABLE IF EXISTS observatory.obs_meta_numer;
DROP TABLE IF EXISTS observatory.obs_meta_denom;
DROP TABLE IF EXISTS observatory.obs_meta_geom;
DROP TABLE IF EXISTS observatory.obs_meta_timespan;
DROP TABLE IF EXISTS observatory.obs_fcd4e4f5610f6764973ef8c0c215b2e80bec8963;
DROP TABLE IF EXISTS observatory.obs_c6fb99c47d61289fbb8e561ff7773799d3fcc308;
DROP TABLE IF EXISTS observatory.obs_6c1309a64d8f3e6986061f4d1ca7b57743e75e74;
DROP TABLE IF EXISTS observatory.obs_7615e8622a68bfc5fe37c69c9880edfb40250103;
DROP TABLE IF EXISTS observatory.obs_d39f7fe5959891c8296490d83c22ded31c54af13;
DROP TABLE IF EXISTS observatory.obs_1babf5a26a1ecda5fb74963e88408f71d0364b81;
DROP TABLE IF EXISTS observatory.obs_65f29658e096ca1485bf683f65fdbc9f05ec3c5d;
DROP TABLE IF EXISTS observatory.obs_144e8b4f906885b2e057ac4842644a553ae49c6e;
DROP TABLE IF EXISTS observatory.obs_fc050f0b8673cfe3c6aa1040f749eb40975691b7;
DROP TABLE IF EXISTS observatory.obs_1a098da56badf5f32e336002b0a81708c40d29cd;
DROP TABLE IF EXISTS observatory.obs_1ea93bbc109c87c676b3270789dacf7a1430db6c;
DROP TABLE IF EXISTS observatory.obs_b393b5b88c6adda634b2071a8005b03c551b609a;
DROP TABLE IF EXISTS observatory.obs_1746e37b7cd28cb131971ea4187d42d71f09c5f3;
DROP TABLE IF EXISTS observatory.obs_a01cd5d8ccaa6531cef715071e9307e6b1987ec3;
